-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.213827655889
cusum  =  0.217887577505
eta  =  0.637671435499
hl_amp_ratio  =  0.845245494527
kurtosis  =  0.673755493422
n_points  =  132
period  =  0.627322787949
period_SNR  =  10.8880711797
period_log10FAP  =  -7.20406339535
period_uncertainty  =  0.000121142208097
phase_cusum  =  0.214081226812
phase_eta  =  0.671792121095
phi21  =  0.983675956949
phi31  =  5.28923026693
quartile31  =  0.2925
r21  =  0.467352789678
r31  =  0.301637929124
shapiro_w  =  0.979649603367
skewness  =  -0.21789268791
slope_per10  =  -0.233767122739
slope_per90  =  0.294321205544
stetson_k  =  0.798222068065
weighted_mean  =  11.3039393939
weighted_std  =  0.220741716533
