-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.26658637131
cusum  =  0.131245614699
eta  =  0.783803922588
hl_amp_ratio  =  0.55639412829
kurtosis  =  -0.566562270819
n_points  =  379
period  =  0.691385588122
period_SNR  =  46.528511603
period_log10FAP  =  -46.268454014
period_uncertainty  =  0.000133307421872
phase_cusum  =  0.228087201443
phase_eta  =  0.488080738851
phi21  =  -2.12720530046
phi31  =  -3.73814757235
quartile31  =  0.37
r21  =  0.416332043689
r31  =  0.179800184285
shapiro_w  =  0.968832969666
skewness  =  -0.347324239536
slope_per10  =  -0.0783000015136
slope_per90  =  0.097917584357
stetson_k  =  0.771188846605
weighted_mean  =  17.7612094824
weighted_std  =  0.246000326875
