<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.300357916977
cusum  =  0.143061887536
eta  =  0.504336303245
hl_amp_ratio  =  0.371978555382
kurtosis  =  -0.170697918946
n_points  =  201
period  =  0.640549963891
period_SNR  =  23.3589780411
period_log10FAP  =  -17.335641229
period_uncertainty  =  0.000144561046381
phase_cusum  =  0.248179962756
phase_eta  =  0.138213388666
phi21  =  -2.31811400723
phi31  =  -4.24760392554
quartile31  =  0.3
r21  =  0.593479738459
r31  =  0.396459138631
shapiro_w  =  0.907029628754
skewness  =  -0.881931671871
slope_per10  =  -0.235978773391
slope_per90  =  0.335744530954
stetson_k  =  0.671419738248
weighted_mean  =  15.7635258243
weighted_std  =  0.25813967421
</pre></body></html>