-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_EC
class_probability =  0.33


######### Lightcurve features #########

amplitude  =  0.418879852312
cusum  =  0.215376418049
eta  =  0.962293012304
hl_amp_ratio  =  2.46457278129
kurtosis  =  -1.07362287555
n_points  =  104
period  =  2.53556424479
period_SNR  =  9.20584221477
period_log10FAP  =  -4.8999151706
period_uncertainty  =  0.0018336458766
phase_cusum  =  0.226982190332
phase_eta  =  0.80486819573
phi21  =  -0.6074068822
phi31  =  -2.32123128827
quartile31  =  0.7375
r21  =  0.143177208613
r31  =  0.170406959774
shapiro_w  =  0.894725680351
skewness  =  0.444334734522
slope_per10  =  -0.275133335963
slope_per90  =  0.61859998852
stetson_k  =  0.733396392998
weighted_mean  =  14.9225040917
weighted_std  =  0.451458028455
