-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.193654786679
cusum  =  0.199211755541
eta  =  0.856310973021
hl_amp_ratio  =  0.703453446646
kurtosis  =  -0.544760764238
n_points  =  156
period  =  0.59260286751
period_SNR  =  22.6604057828
period_log10FAP  =  -15.4120645479
period_uncertainty  =  0.000102384741619
phase_cusum  =  0.311761205689
phase_eta  =  0.584495381884
phi21  =  3.60121211328
phi31  =  2.704258999
quartile31  =  0.3
r21  =  0.40709053361
r31  =  0.0556553687079
shapiro_w  =  0.949364244938
skewness  =  -0.384341300561
slope_per10  =  -0.19051380438
slope_per90  =  0.430300007574
stetson_k  =  0.840625333042
weighted_mean  =  13.4769007158
weighted_std  =  0.186453830423
