-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.326102660644
cusum  =  0.0795112612247
eta  =  0.518740329619
hl_amp_ratio  =  0.452706343954
kurtosis  =  -0.917203138927
n_points  =  660
period  =  0.60043475136
period_SNR  =  77.1009013336
period_log10FAP  =  -94.8006207168
period_uncertainty  =  0.000115283476511
phase_cusum  =  0.259826332291
phase_eta  =  0.137816728259
phi21  =  0.828505352155
phi31  =  2.0084753762
quartile31  =  0.4925
r21  =  0.450624339449
r31  =  0.29934320646
shapiro_w  =  0.914832890034
skewness  =  -0.571781682551
slope_per10  =  -0.115082856606
slope_per90  =  0.101463171516
stetson_k  =  0.796504974865
weighted_mean  =  14.2084095331
weighted_std  =  0.28924412278
