-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.23338851017
cusum  =  0.144488750028
eta  =  0.514617987807
hl_amp_ratio  =  0.907377724593
kurtosis  =  -1.02990062424
n_points  =  356
period  =  0.708377916074
period_SNR  =  39.7724923752
period_log10FAP  =  -43.160128474
period_uncertainty  =  0.000139962448159
phase_cusum  =  0.254508400678
phase_eta  =  0.321642219716
phi21  =  1.17510500621
phi31  =  -0.489975494637
quartile31  =  0.3325
r21  =  0.510279296544
r31  =  0.258305070273
shapiro_w  =  0.968169867992
skewness  =  -0.096857440664
slope_per10  =  -0.176393941145
slope_per90  =  0.318395295394
stetson_k  =  0.845163177569
weighted_mean  =  14.3013039614
weighted_std  =  0.203065419985
