-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.276329564299
cusum  =  0.234458785808
eta  =  0.521426299383
hl_amp_ratio  =  0.430165232915
kurtosis  =  -1.01928276215
n_points  =  167
period  =  0.61701093913
period_SNR  =  23.8462266472
period_log10FAP  =  -19.606827513
period_uncertainty  =  0.000134132819193
phase_cusum  =  0.286067909358
phase_eta  =  0.122110286003
phi21  =  0.936051708081
phi31  =  2.26108856932
quartile31  =  0.455
r21  =  0.52843081879
r31  =  0.230912861577
shapiro_w  =  0.924589276314
skewness  =  -0.4920275719
slope_per10  =  -0.184079011663
slope_per90  =  0.278263367204
stetson_k  =  0.754740093488
weighted_mean  =  14.8772293919
weighted_std  =  0.248784015551
