-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.317703555532
cusum  =  0.130944528907
eta  =  0.554847053537
hl_amp_ratio  =  0.402924984187
kurtosis  =  -0.801260084425
n_points  =  316
period  =  0.617110388671
period_SNR  =  43.8152764818
period_log10FAP  =  -48.1779442651
period_uncertainty  =  0.000127581231145
phase_cusum  =  0.232359504797
phase_eta  =  0.162757175161
phi21  =  0.84254542406
phi31  =  1.7019286124
quartile31  =  0.44
r21  =  0.375609041672
r31  =  0.237102147798
shapiro_w  =  0.8831127882
skewness  =  -0.713368219465
slope_per10  =  -0.178857668131
slope_per90  =  0.331270391072
stetson_k  =  0.789002386649
weighted_mean  =  13.9650046246
weighted_std  =  0.273343060988
