-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.32961132947
cusum  =  0.125332998122
eta  =  0.646669428894
hl_amp_ratio  =  0.306735072514
kurtosis  =  -0.560465413271
n_points  =  167
period  =  0.540173251285
period_SNR  =  23.0782397153
period_log10FAP  =  -17.9728991481
period_uncertainty  =  0.000102805291667
phase_cusum  =  0.282881577817
phase_eta  =  0.449595090032
phi21  =  -2.31599240372
phi31  =  -4.69571885144
quartile31  =  0.45
r21  =  0.41643767664
r31  =  0.284696645033
shapiro_w  =  0.88085258007
skewness  =  -0.792964639185
slope_per10  =  -0.129000004381
slope_per90  =  0.250005124448
stetson_k  =  0.733046113369
weighted_mean  =  15.1548350675
weighted_std  =  0.303157797661
