-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.84


######### Lightcurve features #########

amplitude  =  0.212406302264
cusum  =  0.252877729723
eta  =  0.59764519176
hl_amp_ratio  =  0.320955991461
kurtosis  =  -0.962643236951
n_points  =  151
period  =  0.620466515877
period_SNR  =  26.6224579309
period_log10FAP  =  -19.1118548574
period_uncertainty  =  0.000137139883487
phase_cusum  =  0.323151669472
phase_eta  =  0.313765016039
phi21  =  -2.40362864036
phi31  =  -0.873129283671
quartile31  =  0.27
r21  =  0.366288713205
r31  =  0.140832980931
shapiro_w  =  0.909768044949
skewness  =  -0.557318040732
slope_per10  =  -0.422359016933
slope_per90  =  0.332705639865
stetson_k  =  0.732110296269
weighted_mean  =  15.4525048172
weighted_std  =  0.160724905971
