-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.387775116274
cusum  =  0.152494344976
eta  =  0.585448218119
hl_amp_ratio  =  0.545621243622
kurtosis  =  -0.929743652167
n_points  =  345
period  =  0.64606111685
period_SNR  =  44.2956404661
period_log10FAP  =  -45.5270087917
period_uncertainty  =  0.000115848001864
phase_cusum  =  0.318845451316
phase_eta  =  0.133980428412
phi21  =  -2.23790284171
phi31  =  -1.10779158596
quartile31  =  0.58
r21  =  0.507919261107
r31  =  0.281681535405
shapiro_w  =  0.931499540806
skewness  =  -0.500759159434
slope_per10  =  -0.0989607554604
slope_per90  =  0.246250000782
stetson_k  =  0.797605314024
weighted_mean  =  13.8201858538
weighted_std  =  0.345013362305
