-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.318355082757
cusum  =  0.202482536424
eta  =  0.680717167664
hl_amp_ratio  =  0.381555494788
kurtosis  =  -1.11058659865
n_points  =  161
period  =  0.56270344518
period_SNR  =  26.6079963279
period_log10FAP  =  -18.9666315014
period_uncertainty  =  0.000147487971018
phase_cusum  =  0.312360014492
phase_eta  =  0.210781696305
phi21  =  1.05515702508
phi31  =  2.66587478454
quartile31  =  0.48
r21  =  0.453037410864
r31  =  0.384005598598
shapiro_w  =  0.91666996479
skewness  =  -0.436933446738
slope_per10  =  -0.166292814196
slope_per90  =  0.439866674133
stetson_k  =  0.792795816966
weighted_mean  =  14.0447580095
weighted_std  =  0.293345714277
