-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.27488899942
cusum  =  0.0924284265942
eta  =  0.561247390125
hl_amp_ratio  =  0.458500490971
kurtosis  =  -0.638840102205
n_points  =  251
period  =  0.615057743607
period_SNR  =  30.7697277237
period_log10FAP  =  -29.2237229595
period_uncertainty  =  0.000104858456214
phase_cusum  =  0.252606232583
phase_eta  =  0.314502049991
phi21  =  0.942654337198
phi31  =  -1.03244939382
quartile31  =  0.38
r21  =  0.503222090056
r31  =  0.369260648371
shapiro_w  =  0.928183734417
skewness  =  -0.651098731338
slope_per10  =  -0.136838829661
slope_per90  =  0.386666664854
stetson_k  =  0.791226408948
weighted_mean  =  13.5115854531
weighted_std  =  0.25421513315
