-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.312478811839
cusum  =  0.120942902042
eta  =  0.594105522467
hl_amp_ratio  =  0.409503442179
kurtosis  =  0.222777543497
n_points  =  342
period  =  0.67620757242
period_SNR  =  46.8411879472
period_log10FAP  =  -47.2367601125
period_uncertainty  =  0.000102022870823
phase_cusum  =  0.217612685664
phase_eta  =  0.288883494619
phi21  =  -2.63841843401
phi31  =  -2.34991113947
quartile31  =  0.2675
r21  =  0.31795292784
r31  =  0.251339165284
shapiro_w  =  0.882386207581
skewness  =  -1.06224085662
slope_per10  =  -0.121955418193
slope_per90  =  0.24314439643
stetson_k  =  0.71342928511
weighted_mean  =  15.4839267378
weighted_std  =  0.231117452098
