-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.66


######### Lightcurve features #########

amplitude  =  0.222633348744
cusum  =  0.0860171458635
eta  =  0.50882439533
hl_amp_ratio  =  0.787408368337
kurtosis  =  -0.741981631007
n_points  =  381
period  =  0.606988651216
period_SNR  =  40.1672970733
period_log10FAP  =  -43.419552424
period_uncertainty  =  0.000115309398389
phase_cusum  =  0.195369059711
phase_eta  =  0.824131387845
phi21  =  1.39034465082
phi31  =  3.22189496562
quartile31  =  0.3
r21  =  0.278919911858
r31  =  0.0431449556302
shapiro_w  =  0.978396832943
skewness  =  -0.265549130461
slope_per10  =  -0.111288447046
slope_per90  =  0.150299890029
stetson_k  =  0.826631292487
weighted_mean  =  15.468614632
weighted_std  =  0.198438059455
