<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_c
class_probability =  0.49


######### Lightcurve features #########

amplitude  =  0.192998655591
cusum  =  0.202885469201
eta  =  0.616356844926
hl_amp_ratio  =  2.93056168251
kurtosis  =  -1.37369409829
n_points  =  73
period  =  0.363907
period_SNR  =  11.7551686973
period_log10FAP  =  -7.46093756574
period_uncertainty  =  2.87787269495e-05
phase_cusum  =  0.354408471527
phase_eta  =  0.271863285026
phi21  =  -1.05478758061
phi31  =  -0.708828395393
quartile31  =  0.33
r21  =  0.264324429611
r31  =  0.0814867037014
shapiro_w  =  0.890021979809
skewness  =  0.206216042254
slope_per10  =  -0.391328569539
slope_per90  =  0.549099980853
stetson_k  =  0.809537921761
weighted_mean  =  14.6663761468
weighted_std  =  0.160255489193
</pre></body></html>