-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.33


######### Lightcurve features #########

amplitude  =  0.18283827648
cusum  =  0.150641728109
eta  =  1.05988089429
hl_amp_ratio  =  0.672017382993
kurtosis  =  -1.11720878636
n_points  =  81
period  =  0.21999891168
period_SNR  =  13.7845881413
period_log10FAP  =  -7.50141904365
period_uncertainty  =  1.20497829571e-05
phase_cusum  =  0.271307708104
phase_eta  =  0.212721564393
phi21  =  4.25900435585
phi31  =  2.62232779013
quartile31  =  0.24
r21  =  0.49325544479
r31  =  0.184767844341
shapiro_w  =  0.957562446594
skewness  =  -0.0867141964566
slope_per10  =  -0.163774084064
slope_per90  =  0.420110677403
stetson_k  =  0.840848124093
weighted_mean  =  13.518033295
weighted_std  =  0.147650935246
