-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.166402488967
cusum  =  0.117369932757
eta  =  0.600361641395
hl_amp_ratio  =  0.465478940531
kurtosis  =  -1.03986465106
n_points  =  373
period  =  0.649219835833
period_SNR  =  45.9379627521
period_log10FAP  =  -50.8597488366
period_uncertainty  =  0.000109658106482
phase_cusum  =  0.265129545225
phase_eta  =  0.403020908585
phi21  =  0.911344324274
phi31  =  1.76948487078
quartile31  =  0.26
r21  =  0.391890041945
r31  =  0.128553064432
shapiro_w  =  0.928733229637
skewness  =  -0.470821760431
slope_per10  =  -0.138673963073
slope_per90  =  0.114415941976
stetson_k  =  0.790572386031
weighted_mean  =  16.6599510209
weighted_std  =  0.15507058397
