-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.255541357252
cusum  =  0.141830367143
eta  =  0.502226856163
hl_amp_ratio  =  0.947419969616
kurtosis  =  -1.13965704099
n_points  =  296
period  =  0.564337890452
period_SNR  =  36.3940243932
period_log10FAP  =  -37.6536991754
period_uncertainty  =  0.00010683496763
phase_cusum  =  0.243304519549
phase_eta  =  0.0787549208255
phi21  =  -1.78148458382
phi31  =  -0.131310231749
quartile31  =  0.33
r21  =  0.489179877088
r31  =  0.340621636812
shapiro_w  =  0.957105398178
skewness  =  -0.150256669651
slope_per10  =  -0.212116993866
slope_per90  =  0.305206640693
stetson_k  =  0.872327804539
weighted_mean  =  13.2690519187
weighted_std  =  0.197377854939
