-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.288545676525
cusum  =  0.122259729713
eta  =  1.0560816496
hl_amp_ratio  =  0.669907639203
kurtosis  =  0.452844028349
n_points  =  94
period  =  0.612344052204
period_SNR  =  15.3140542159
period_log10FAP  =  -7.21545600336
period_uncertainty  =  0.000109183380446
phase_cusum  =  0.249338994644
phase_eta  =  0.272561880687
phi21  =  -2.43475197607
phi31  =  -1.54465541998
quartile31  =  0.2875
r21  =  0.500455018496
r31  =  0.317652366351
shapiro_w  =  0.931715786457
skewness  =  -0.858014055945
slope_per10  =  -0.285284384953
slope_per90  =  0.613043367564
stetson_k  =  0.790043909023
weighted_mean  =  14.4367328699
weighted_std  =  0.201881790513
