-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.172405291311
cusum  =  0.218318808489
eta  =  0.65889044988
hl_amp_ratio  =  0.368066914394
kurtosis  =  -0.193932962866
n_points  =  184
period  =  0.597032503177
period_SNR  =  20.8544374062
period_log10FAP  =  -14.0237001457
period_uncertainty  =  0.000147519511901
phase_cusum  =  0.246852594267
phase_eta  =  0.673099229674
phi21  =  0.79916667771
phi31  =  -1.5331529162
quartile31  =  0.27
r21  =  0.371282873702
r31  =  0.197072282026
shapiro_w  =  0.925387620926
skewness  =  -0.775398012392
slope_per10  =  -0.119738797436
slope_per90  =  0.224570869003
stetson_k  =  0.72173020503
weighted_mean  =  14.9391920422
weighted_std  =  0.176388523188
