-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.233422549465
cusum  =  0.184486308167
eta  =  0.686533497208
hl_amp_ratio  =  0.571812863251
kurtosis  =  -0.298474332675
n_points  =  210
period  =  0.602165691866
period_SNR  =  25.1249241327
period_log10FAP  =  -19.3244923198
period_uncertainty  =  0.000140739902125
phase_cusum  =  0.256729002078
phase_eta  =  0.827939631004
phi21  =  0.943920537943
phi31  =  0.949899045058
quartile31  =  0.35
r21  =  0.289592222716
r31  =  0.095793154782
shapiro_w  =  0.961994111538
skewness  =  -0.52755633333
slope_per10  =  -0.07447374682
slope_per90  =  0.249466652361
stetson_k  =  0.808634632904
weighted_mean  =  12.3333847403
weighted_std  =  0.238706242392
