-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.54


######### Lightcurve features #########

amplitude  =  0.279327473564
cusum  =  0.226110094088
eta  =  1.0817204183
hl_amp_ratio  =  0.347248538626
kurtosis  =  -1.2440835612
n_points  =  48
period  =  0.563351447328
period_SNR  =  7.98393822192
period_log10FAP  =  -1.64804326341
period_uncertainty  =  0.000114677144157
phase_cusum  =  0.256878239802
phase_eta  =  0.938620468419
phi21  =  0.0649752492199
phi31  =  0.929014281175
quartile31  =  0.365
r21  =  0.192986022343
r31  =  0.149097164762
shapiro_w  =  0.846926212311
skewness  =  -0.539162348218
slope_per10  =  -0.50408633066
slope_per90  =  0.322686346374
stetson_k  =  0.760419251847
weighted_mean  =  15.0116666667
weighted_std  =  0.194104067162
