-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.29731382561
cusum  =  0.148836466783
eta  =  0.543658881256
hl_amp_ratio  =  1.3063839659
kurtosis  =  -1.05226960753
n_points  =  192
period  =  0.755029709521
period_SNR  =  26.3624489011
period_log10FAP  =  -21.6767684657
period_uncertainty  =  0.000236941113444
phase_cusum  =  0.251916989349
phase_eta  =  0.233996922105
phi21  =  -1.73437729029
phi31  =  -3.26372111963
quartile31  =  0.3725
r21  =  0.496449290743
r31  =  0.300155268666
shapiro_w  =  0.962613880634
skewness  =  0.0477807339425
slope_per10  =  -0.401387037119
slope_per90  =  0.65951608291
stetson_k  =  0.863315805419
weighted_mean  =  12.5474993297
weighted_std  =  0.235071698215
