-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_Other
class_probability =  0.3


######### Lightcurve features #########

amplitude  =  0.112355340857
cusum  =  0.247004048785
eta  =  0.713756329137
hl_amp_ratio  =  0.72763387045
kurtosis  =  -0.597066791161
n_points  =  53
period  =  0.230799957005
period_SNR  =  8.59084105529
period_log10FAP  =  -2.95137221979
period_uncertainty  =  2.49860766715e-05
phase_cusum  =  0.246512559975
phase_eta  =  0.681713637651
phi21  =  -0.514519969541
phi31  =  -3.50740717058
quartile31  =  0.15
r21  =  0.201234111027
r31  =  0.237451722653
shapiro_w  =  0.971247196198
skewness  =  -0.331972449975
slope_per10  =  -0.539200012572
slope_per90  =  0.245563779253
stetson_k  =  0.813641312554
weighted_mean  =  14.7971125612
weighted_std  =  0.0945642468994
