-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.212204377626
cusum  =  0.0729138204001
eta  =  0.658763968665
hl_amp_ratio  =  0.405187449836
kurtosis  =  -0.889915730312
n_points  =  338
period  =  0.602523156826
period_SNR  =  45.8008752307
period_log10FAP  =  -48.8483140858
period_uncertainty  =  0.000102005006671
phase_cusum  =  0.252567460355
phase_eta  =  0.193071418553
phi21  =  -2.26696181286
phi31  =  -4.17397901779
quartile31  =  0.33
r21  =  0.432011746652
r31  =  0.272238624727
shapiro_w  =  0.934705257416
skewness  =  -0.499298331903
slope_per10  =  -0.168526852583
slope_per90  =  0.16059308037
stetson_k  =  0.764321802145
weighted_mean  =  15.9478947368
weighted_std  =  0.194723977696
