-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.242094977406
cusum  =  0.142539554677
eta  =  0.602710703285
hl_amp_ratio  =  0.344460769292
kurtosis  =  -0.0102499126061
n_points  =  336
period  =  0.563443678899
period_SNR  =  45.7538861765
period_log10FAP  =  -45.790353376
period_uncertainty  =  0.000103384164747
phase_cusum  =  0.284633389153
phase_eta  =  0.332028104369
phi21  =  0.718764973743
phi31  =  -1.20854726968
quartile31  =  0.33
r21  =  0.395717113985
r31  =  0.172213200501
shapiro_w  =  0.900962412357
skewness  =  -0.924768661815
slope_per10  =  -0.136295049751
slope_per90  =  0.139401906503
stetson_k  =  0.736123715003
weighted_mean  =  13.0821034311
weighted_std  =  0.212935256391
