-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.332436160434
cusum  =  0.183603111333
eta  =  0.417019748309
hl_amp_ratio  =  0.251364319627
kurtosis  =  -0.833408194373
n_points  =  166
period  =  0.611722082813
period_SNR  =  19.3992834262
period_log10FAP  =  -17.4706288707
period_uncertainty  =  0.000106076524324
phase_cusum  =  0.259390960803
phase_eta  =  0.197875083604
phi21  =  0.797748484725
phi31  =  2.14754597964
quartile31  =  0.4875
r21  =  0.343350349067
r31  =  0.0568150057185
shapiro_w  =  0.886961817741
skewness  =  -0.687219880906
slope_per10  =  -0.283200000413
slope_per90  =  0.348199997097
stetson_k  =  0.737946355017
weighted_mean  =  12.867328629
weighted_std  =  0.314579886366
