-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.76


######### Lightcurve features #########

amplitude  =  0.267711101744
cusum  =  0.328495267843
eta  =  0.502602495449
hl_amp_ratio  =  0.358828413499
kurtosis  =  -1.02045061411
n_points  =  57
period  =  0.632939016703
period_SNR  =  11.244418796
period_log10FAP  =  -3.89242400223
period_uncertainty  =  0.000199413693711
phase_cusum  =  0.223805038625
phase_eta  =  0.351187548082
phi21  =  1.16434508843
phi31  =  2.41638760996
quartile31  =  0.38
r21  =  0.611536717199
r31  =  0.429148127308
shapiro_w  =  0.890963971615
skewness  =  -0.598495636369
slope_per10  =  -0.46554412086
slope_per90  =  0.918624876323
stetson_k  =  0.743785026274
weighted_mean  =  14.6467234967
weighted_std  =  0.242005351188
