-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.36127481542
cusum  =  0.198070871421
eta  =  1.13921028383
hl_amp_ratio  =  0.946233149179
kurtosis  =  -0.386650048395
n_points  =  362
period  =  0.645399690094
period_SNR  =  37.1701303312
period_log10FAP  =  -27.0302086348
period_uncertainty  =  0.000115472645446
phase_cusum  =  0.277396217249
phase_eta  =  0.809564343604
phi21  =  -2.09960453266
phi31  =  -4.06336399585
quartile31  =  0.5
r21  =  0.494567099777
r31  =  0.385470632137
shapiro_w  =  0.99425894022
skewness  =  -0.0691240534773
slope_per10  =  -0.0520806433587
slope_per90  =  0.0392607324733
stetson_k  =  0.789766893757
weighted_mean  =  18.9481836781
weighted_std  =  0.339785495845
