<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.6


######### Lightcurve features #########

amplitude  =  0.390038854108
cusum  =  0.158740046871
eta  =  0.42857369007
hl_amp_ratio  =  0.367318772142
kurtosis  =  -1.14453820013
n_points  =  109
period  =  0.598127081837
period_SNR  =  12.6697148308
period_log10FAP  =  -10.1446404349
period_uncertainty  =  7.67223052435e-05
phase_cusum  =  0.269303369898
phase_eta  =  0.0891795539627
phi21  =  3.98399078799
phi31  =  5.23831713455
quartile31  =  0.51
r21  =  0.657222803481
r31  =  0.346112127465
shapiro_w  =  0.898076891899
skewness  =  -0.472230157531
slope_per10  =  -0.133918405512
slope_per90  =  0.681999977678
stetson_k  =  0.741501984298
weighted_mean  =  14.5004378284
weighted_std  =  0.35432724182
</pre></body></html>