-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.61


######### Lightcurve features #########

amplitude  =  0.120083972232
cusum  =  0.12068377582
eta  =  0.502791546803
hl_amp_ratio  =  1.02745183574
kurtosis  =  -1.36462191917
n_points  =  320
period  =  0.648517092368
period_SNR  =  48.1183491043
period_log10FAP  =  -52.9465855014
period_uncertainty  =  0.000117187768828
phase_cusum  =  0.271226513955
phase_eta  =  0.211591583224
phi21  =  -1.88744698818
phi31  =  -0.164642804739
quartile31  =  0.18
r21  =  0.232207986984
r31  =  0.0794437433709
shapiro_w  =  0.92574608326
skewness  =  -0.117822927435
slope_per10  =  -0.248662946428
slope_per90  =  0.32477718328
stetson_k  =  0.871630244283
weighted_mean  =  14.3360932848
weighted_std  =  0.096380513274
