-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.197288155091
cusum  =  0.10248148685
eta  =  0.521399057546
hl_amp_ratio  =  0.396183336648
kurtosis  =  -0.377182611901
n_points  =  350
period  =  0.643942583602
period_SNR  =  46.2791576393
period_log10FAP  =  -50.2390715471
period_uncertainty  =  0.000141671153147
phase_cusum  =  0.249306815893
phase_eta  =  0.147804733281
phi21  =  4.05670831381
phi31  =  5.23062230844
quartile31  =  0.29
r21  =  0.505316162005
r31  =  0.272559127342
shapiro_w  =  0.904352843761
skewness  =  -0.825415420892
slope_per10  =  -0.16897382186
slope_per90  =  0.244244542666
stetson_k  =  0.745994118757
weighted_mean  =  12.989036965
weighted_std  =  0.175732061356
