-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  LPV_SRV_AGB_O
class_probability =  0.38


######### Lightcurve features #########

amplitude  =  0.514487454545
cusum  =  0.272270245091
eta  =  0.626869891326
hl_amp_ratio  =  1.39667266231
kurtosis  =  -0.0869166890882
n_points  =  45
period  =  119.933685333
period_SNR  =  7.52281894635
period_log10FAP  =  -3.00907528314
period_uncertainty  =  5.58697291925
phase_cusum  =  0.351873833339
phase_eta  =  0.478425588252
phi21  =  2.38627827298
phi31  =  0.569779885248
quartile31  =  0.29
r21  =  0.842609430866
r31  =  0.486969870534
shapiro_w  =  0.946663320065
skewness  =  0.56876846252
slope_per10  =  -0.628999993205
slope_per90  =  230.359622226
stetson_k  =  0.82798303395
weighted_mean  =  15.4974516129
weighted_std  =  0.189883553231
