-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_e
class_probability =  0.39


######### Lightcurve features #########

amplitude  =  0.125986354845
cusum  =  0.127523438635
eta  =  0.650193674285
hl_amp_ratio  =  1.57844810412
kurtosis  =  -1.19752466873
n_points  =  274
period  =  0.280002515588
period_SNR  =  13.9647235723
period_log10FAP  =  -20.9092156593
period_uncertainty  =  2.65900905629e-05
phase_cusum  =  0.197894853928
phase_eta  =  0.698751290224
phi21  =  -2.79453392884
phi31  =  -4.13177267581
quartile31  =  0.2375
r21  =  0.246418930472
r31  =  0.27258418112
shapiro_w  =  0.940677285194
skewness  =  0.282982049485
slope_per10  =  -0.0798539616868
slope_per90  =  0.0600000098348
stetson_k  =  0.854412705575
weighted_mean  =  15.4312386945
weighted_std  =  0.131548743842
