-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.197624636145
cusum  =  0.114147771056
eta  =  0.552293016005
hl_amp_ratio  =  1.1203922902
kurtosis  =  -0.974370493753
n_points  =  204
period  =  0.668288473265
period_SNR  =  31.0623819181
period_log10FAP  =  -26.3465769748
period_uncertainty  =  0.000179165823143
phase_cusum  =  0.260129250557
phase_eta  =  0.107569818448
phi21  =  -1.96992431792
phi31  =  -3.75402866906
quartile31  =  0.23
r21  =  0.48434051647
r31  =  0.281430343229
shapiro_w  =  0.963044762611
skewness  =  -0.171865434112
slope_per10  =  -0.361061011027
slope_per90  =  0.546716491461
stetson_k  =  0.83166312975
weighted_mean  =  14.1399694171
weighted_std  =  0.1473937619
