-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.48


######### Lightcurve features #########

amplitude  =  0.181304416646
cusum  =  0.168562601885
eta  =  0.668722990292
hl_amp_ratio  =  0.694350099605
kurtosis  =  -0.604919725458
n_points  =  227
period  =  0.35298906384
period_SNR  =  18.1282735117
period_log10FAP  =  -15.4882430446
period_uncertainty  =  5.65800957472e-05
phase_cusum  =  0.264118286467
phase_eta  =  1.02772273238
phi21  =  -2.7459198444
phi31  =  -3.04124027539
quartile31  =  0.27
r21  =  0.141371342755
r31  =  0.195900196823
shapiro_w  =  0.96537065506
skewness  =  -0.449986617612
slope_per10  =  -0.116728792017
slope_per90  =  0.0550430119849
stetson_k  =  0.812772807271
weighted_mean  =  12.655832106
weighted_std  =  0.196635937683
