-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.241569473418
cusum  =  0.188554962419
eta  =  1.00677910635
hl_amp_ratio  =  0.809354626513
kurtosis  =  -0.320836344569
n_points  =  334
period  =  0.637189354155
period_SNR  =  34.2722874873
period_log10FAP  =  -26.9153997355
period_uncertainty  =  0.000112553764792
phase_cusum  =  0.208604128557
phase_eta  =  0.939895318432
phi21  =  -2.10520212037
phi31  =  -4.30056573974
quartile31  =  0.3775
r21  =  0.460965261679
r31  =  0.290335020756
shapiro_w  =  0.992714345455
skewness  =  0.0833666909338
slope_per10  =  -0.0650613638572
slope_per90  =  0.0543565371169
stetson_k  =  0.782678905489
weighted_mean  =  18.156615566
weighted_std  =  0.260999015824
