-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.210577873167
cusum  =  0.138421101269
eta  =  0.655645372162
hl_amp_ratio  =  0.516135411805
kurtosis  =  -0.113124343202
n_points  =  259
period  =  0.613866981572
period_SNR  =  29.953804564
period_log10FAP  =  -22.5849103026
period_uncertainty  =  0.000173323079914
phase_cusum  =  0.2634627044
phase_eta  =  0.6211022253
phi21  =  -2.11537629067
phi31  =  -4.50274049753
quartile31  =  0.28
r21  =  0.374288772517
r31  =  0.211603069295
shapiro_w  =  0.94406080246
skewness  =  -0.72884437842
slope_per10  =  -0.179840562041
slope_per90  =  0.227395355531
stetson_k  =  0.762408180993
weighted_mean  =  14.0874305843
weighted_std  =  0.204826870741
