-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.176020898558
cusum  =  0.121570069097
eta  =  1.38661012542
hl_amp_ratio  =  1.06944710428
kurtosis  =  -0.635921377175
n_points  =  361
period  =  0.76361515793
period_SNR  =  37.8186842629
period_log10FAP  =  -22.9433426562
period_uncertainty  =  0.000161673270407
phase_cusum  =  0.181596854772
phase_eta  =  1.25894706534
phi21  =  1.76318780393
phi31  =  3.19193929258
quartile31  =  0.28
r21  =  0.320741490694
r31  =  0.0890638890979
shapiro_w  =  0.990259349346
skewness  =  0.0254609631315
slope_per10  =  -0.0787899022302
slope_per90  =  0.0672027913995
stetson_k  =  0.824188930496
weighted_mean  =  18.7218929977
weighted_std  =  0.188291181457
