-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.35


######### Lightcurve features #########

amplitude  =  0.191884646345
cusum  =  0.300554808053
eta  =  0.730454225706
hl_amp_ratio  =  0.926160340797
kurtosis  =  -1.37290175887
n_points  =  25
period  =  0.192507683578
period_SNR  =  5.10714664536
period_log10FAP  =  -0.0860542729256
period_uncertainty  =  6.80599907436e-06
phase_cusum  =  0.422348259683
phase_eta  =  0.258296904834
phi21  =  -0.39037978098
phi31  =  0.459828648813
quartile31  =  0.33
r21  =  0.0414900458041
r31  =  0.156634822695
shapiro_w  =  0.887540817261
skewness  =  -0.267078694548
slope_per10  =  -0.432446124589
slope_per90  =  0.595800019801
stetson_k  =  0.85690950281
weighted_mean  =  13.328
weighted_std  =  0.162898741554
