-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.74


######### Lightcurve features #########

amplitude  =  0.175757187945
cusum  =  0.124823786312
eta  =  0.559738045397
hl_amp_ratio  =  0.7046385287
kurtosis  =  -1.18261329754
n_points  =  272
period  =  0.681876941213
period_SNR  =  36.5401573801
period_log10FAP  =  -36.6174042551
period_uncertainty  =  0.000105073882025
phase_cusum  =  0.236252218366
phase_eta  =  0.214415170923
phi21  =  0.991112408613
phi31  =  2.60679694115
quartile31  =  0.27
r21  =  0.4541872155
r31  =  0.222906802213
shapiro_w  =  0.949032247066
skewness  =  -0.214344738411
slope_per10  =  -0.230937150092
slope_per90  =  0.566390999676
stetson_k  =  0.851435675254
weighted_mean  =  13.9726255672
weighted_std  =  0.147850791389
