-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.44


######### Lightcurve features #########

amplitude  =  0.328211950897
cusum  =  0.175295305047
eta  =  0.772285572353
hl_amp_ratio  =  0.478584723513
kurtosis  =  -1.13164145054
n_points  =  68
period  =  0.885968831924
period_SNR  =  10.8929445848
period_log10FAP  =  -6.51438332037
period_uncertainty  =  0.000234135542759
phase_cusum  =  0.289909955968
phase_eta  =  0.309532397156
phi21  =  -0.984002382713
phi31  =  -2.84560163398
quartile31  =  0.4225
r21  =  0.133551784768
r31  =  0.285719394693
shapiro_w  =  0.928150594234
skewness  =  -0.380045788781
slope_per10  =  -0.335607759706
slope_per90  =  0.41368934391
stetson_k  =  0.792184575996
weighted_mean  =  19.2642072579
weighted_std  =  0.251512694047
