-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.283616248896
cusum  =  0.135343610949
eta  =  0.557662870696
hl_amp_ratio  =  0.624081558437
kurtosis  =  -0.596218811558
n_points  =  234
period  =  0.648059435206
period_SNR  =  26.9074785377
period_log10FAP  =  -25.3816497793
period_uncertainty  =  0.00011867481982
phase_cusum  =  0.265698427008
phase_eta  =  0.269517690214
phi21  =  0.864350143665
phi31  =  2.096430242
quartile31  =  0.315
r21  =  0.487979750036
r31  =  0.290906831214
shapiro_w  =  0.955291032791
skewness  =  -0.51264728417
slope_per10  =  -0.247794723689
slope_per90  =  0.395749998279
stetson_k  =  0.793517635822
weighted_mean  =  14.2059727817
weighted_std  =  0.212289880284
