-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_e
class_probability =  0.57


######### Lightcurve features #########

amplitude  =  0.103577545814
cusum  =  0.125940893347
eta  =  0.694998752267
hl_amp_ratio  =  1.06578623841
kurtosis  =  -0.669808197163
n_points  =  364
period  =  0.26576084996
period_SNR  =  43.3594279399
period_log10FAP  =  -46.7919307498
period_uncertainty  =  2.34971723826e-05
phase_cusum  =  0.247714951121
phase_eta  =  0.574144867604
phi21  =  1.06938019112
phi31  =  -1.33348083437
quartile31  =  0.14
r21  =  0.113829667805
r31  =  0.106678145435
shapiro_w  =  0.983882546425
skewness  =  -0.156800031111
slope_per10  =  -0.0720781665612
slope_per90  =  0.0659230686874
stetson_k  =  0.832372246299
weighted_mean  =  15.7902028554
weighted_std  =  0.0880091988059
