<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.340421488342
cusum  =  0.117708048258
eta  =  0.657572668751
hl_amp_ratio  =  0.500922371077
kurtosis  =  -0.568922887168
n_points  =  287
period  =  0.630509450526
period_SNR  =  33.1505327824
period_log10FAP  =  -32.6846004342
period_uncertainty  =  0.000110607934383
phase_cusum  =  0.240581592726
phase_eta  =  0.152913283159
phi21  =  -2.1642297107
phi31  =  -4.10915600374
quartile31  =  0.42
r21  =  0.571307578883
r31  =  0.392383362699
shapiro_w  =  0.938450813293
skewness  =  -0.502757092861
slope_per10  =  -0.127308928142
slope_per90  =  0.197831777234
stetson_k  =  0.757461806683
weighted_mean  =  16.6226842603
weighted_std  =  0.297109237871
</pre></body></html>