-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.68


######### Lightcurve features #########

amplitude  =  0.214027064484
cusum  =  0.282521369668
eta  =  0.563759896432
hl_amp_ratio  =  0.336288563541
kurtosis  =  -0.15778247439
n_points  =  74
period  =  0.64438420851
period_SNR  =  10.6894280481
period_log10FAP  =  -6.76564892081
period_uncertainty  =  0.000102879256795
phase_cusum  =  0.225557375513
phase_eta  =  0.30816156184
phi21  =  0.0911476377872
phi31  =  -0.964312935338
quartile31  =  0.23
r21  =  0.313566640623
r31  =  0.240169974392
shapiro_w  =  0.87815374136
skewness  =  -0.941699681616
slope_per10  =  -0.339133335898
slope_per90  =  0.60307705286
stetson_k  =  0.688260538329
weighted_mean  =  14.4451025641
weighted_std  =  0.157678233685
