-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.68


######### Lightcurve features #########

amplitude  =  0.275422161667
cusum  =  0.179935796985
eta  =  0.861982705875
hl_amp_ratio  =  0.554884637528
kurtosis  =  -0.0841993610061
n_points  =  60
period  =  0.177923851163
period_SNR  =  8.35658515755
period_log10FAP  =  -2.97972169074
period_uncertainty  =  9.85203723707e-06
phase_cusum  =  0.319003918453
phase_eta  =  0.629073346417
phi21  =  0.931817040374
phi31  =  3.67438700006
quartile31  =  0.38
r21  =  0.251258757697
r31  =  0.207830270083
shapiro_w  =  0.940712630749
skewness  =  -0.771825523829
slope_per10  =  -0.0843214246977
slope_per90  =  0.100032501784
stetson_k  =  0.738001420844
weighted_mean  =  16.279129474
weighted_std  =  0.280175956363
