-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.6


######### Lightcurve features #########

amplitude  =  0.299992164704
cusum  =  0.204958993981
eta  =  1.8138247541
hl_amp_ratio  =  0.819143555013
kurtosis  =  0.19268689362
n_points  =  267
period  =  0.357243142382
period_SNR  =  21.3185915047
period_log10FAP  =  -6.83604380845
period_uncertainty  =  3.53832203306e-05
phase_cusum  =  0.223649041079
phase_eta  =  1.50612873433
phi21  =  0.907798930685
phi31  =  4.08660453845
quartile31  =  0.545
r21  =  0.1499269013
r31  =  0.189928327643
shapiro_w  =  0.993574619293
skewness  =  -0.0468302788835
slope_per10  =  -0.0191152393833
slope_per90  =  0.020386191823
stetson_k  =  0.736528115101
weighted_mean  =  18.9642295732
weighted_std  =  0.436537506073
